
diff -r 81945eedc63f -r f8ee375445e6 src_js/iconolab-bundle/src/components/collectionhome/tabselector/TabSelector.vue
--- a/src_js/iconolab-bundle/src/components/collectionhome/tabselector/TabSelector.vue	Wed Feb 15 16:42:06 2017 +0100
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,24 +0,0 @@
-<script>
-
-export default {
-	data () {
-		return {}
-	},
-	mounted () {
-		var self=this;
-	 	$(".collection-home-block:not(.selected)").hide();
-	},
-	methods: {
-		switchTab: function(name){
-		    $(".collection-home-block").removeClass("selected");
-		    $(".collection-home-block").hide();
-		    $(".collection-home-tab").parent().removeClass("active");
-		    $("#list-"+name).show();
-		    $("#tab-"+name).addClass("active");
-		    
-		}
-	}
-}
-
-
-</script>
\ No newline at end of file




