
diff -r 81945eedc63f -r f8ee375445e6 src_js/iconolab-bundle/src/components/collectionhome/descriptionviewer/DescriptionViewer.vue
--- a/src_js/iconolab-bundle/src/components/collectionhome/descriptionviewer/DescriptionViewer.vue	Wed Feb 15 16:42:06 2017 +0100
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,20 +0,0 @@
-<script>
-export default {
-      data: {
-        
-      },
-      mounted() {
-          $(".collection-description-complete").hide();
-      },
-      methods: {
-          showCompleteDescription: function(){
-              $(".collection-description").hide()
-              $(".collection-description-complete").show()
-          },
-          hideCompleteDescription: function(name){
-              $(".collection-description-complete").hide()
-              $(".collection-description").show()
-          }
-      },
-}
-</script>
\ No newline at end of file




