
diff -r f5f54b075813 -r ab794183f134 src_js/iconolab-bundle/src/components/collectionselector/CollectionSelector.vue
--- a/src_js/iconolab-bundle/src/components/collectionselector/CollectionSelector.vue	Tue Dec 06 14:11:11 2016 +0100
+++ b/src_js/iconolab-bundle/src/components/collectionselector/CollectionSelector.vue	Tue Dec 06 16:11:12 2016 +0100
@@ -8,11 +8,13 @@
 		var self=this;
 		$(".collection-container").hide();
 		$(".collection-description-complete").hide();
+	    $("#show-main-collections").hide();
 	},
 	methods: {
-	 	pickCollection: function(name){
+	 	pickOtherCollection: function(name){
 		    if (!$("#show-collection-"+name).hasClass("btn-primary")){
 			    $("#main-panel").hide();
+			    $("#show-main-collections").show();
 	     	    $(".collection-container").removeClass("selected");
 	     	    $(".collection-container:not(.selected)").hide();
 			    $(".collection-description-complete").hide()
@@ -23,6 +25,13 @@
 	     	    $(".collection-container#collection-panel-"+name).addClass("selected")
 		    }
 		},
+		showMainPanel: function(){
+     	    $(".collection-container").removeClass("selected");
+     	    $(".btn-collection").removeClass("btn-primary")
+     	    $(".collection-container").hide();
+		    $("#main-panel").show();
+		    $("#show-main-collections").hide();
+		},
 		showCompleteDescription: function(name){
 		    $(".collection-description-complete").hide()
 		    $("#collection-description-short-"+name).hide()




