
diff -r 6d46a199d5db -r 47080491b330 src_js/iconolab-bundle/src/components/editor/AnnotationForm.vue
--- a/src_js/iconolab-bundle/src/components/editor/AnnotationForm.vue	Fri Apr 28 15:55:03 2017 +0200
+++ b/src_js/iconolab-bundle/src/components/editor/AnnotationForm.vue	Tue May 02 13:50:05 2017 +0200
@@ -1,6 +1,8 @@
 <template>
     <div>
-        <button v-if="annotation && isAuthenticated" @click="readonly = !readonly"
+        <button
+            data-intro="Proposez une nouvelle version" data-position="left"
+            v-if="annotation && isAuthenticated" @click="readonly = !readonly"
             class="btn btn-xs pull-right"
             v-bind:class="{ 'btn-primary': readonly, 'btn-warning': !readonly }">
             <i class="fa fa-edit" v-if="readonly"></i>




