
diff -r 7c0b98b10e00 -r 2d5557c01f95 src_js/iconolab-bundle/src/components/editor/CommentList.vue
--- a/src_js/iconolab-bundle/src/components/editor/CommentList.vue	Wed Feb 22 18:31:58 2017 +0100
+++ b/src_js/iconolab-bundle/src/components/editor/CommentList.vue	Wed Feb 22 18:32:39 2017 +0100
@@ -1,6 +1,6 @@
 <template>
     <div v-show="annotation">
-        <label class="form-label">Commentaires</label>
+        <label class="small text-muted">Commentaires</label>
         <div v-show="comments.length === 0" class="alert alert-info">Pas de commentaire pour le moment.</div>
         <comment
             v-for="comment in comments"




