
diff -r 18d1da86fc67 -r 1c7cce196665 src_js/iconolab-bundle/src/components/collectionhome/tabselector/TabSelector.vue
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/src_js/iconolab-bundle/src/components/collectionhome/tabselector/TabSelector.vue	Thu Oct 06 15:07:50 2016 +0200
@@ -0,0 +1,24 @@
+<script>
+
+export default {
+	data () {
+		return {}
+	},
+	mounted () {
+		var self=this;
+	 	$(".collection-home-block:not(.selected)").hide();
+	},
+	methods: {
+		switchTab: function(name){
+		    $(".collection-home-block").removeClass("selected");
+		    $(".collection-home-block").hide();
+		    $(".collection-home-tab").parent().removeClass("active");
+		    $("#list-"+name).show();
+		    $("#tab-"+name).addClass("active");
+		    
+		}
+	}
+}
+
+
+</script>
\ No newline at end of file




