
diff -r 3ad571e54608 -r 08b008c5a07d sql/create_db.sql
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/sql/create_db.sql	Wed Jun 22 01:00:47 2011 +0200
@@ -0,0 +1,7 @@
+CREATE DATABASE hdabo
+  WITH ENCODING='UTF8'
+       OWNER=iri
+       TEMPLATE=template0
+       LC_COLLATE='fr_FR.UTF-8'
+       LC_CTYPE='fr_FR.UTF-8'
+       CONNECTION LIMIT=-1;
\ No newline at end of file




