
diff -r 07239de796bb -r e756a8c72c3d cms/drupal/modules/simpletest/files/sql-2.sql
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/cms/drupal/modules/simpletest/files/sql-2.sql	Fri Sep 08 12:04:06 2017 +0200
@@ -0,0 +1,1 @@
+SELECT invalid_field FROM {invalid_table}
\ No newline at end of file




