
diff -r ba1be1ffaa11 -r 468bf32a3664 sql/create_database_wordpress.sql
--- a/sql/create_database_wordpress.sql	Mon Mar 22 10:49:29 2010 +0000
+++ b/sql/create_database_wordpress.sql	Mon Mar 22 15:58:56 2010 +0100
@@ -791,8 +791,7 @@
 --
 
 INSERT DELAYED IGNORE INTO `wp_users` (`ID`, `user_login`, `user_pass`, `user_nicename`, `user_email`, `user_url`, `user_registered`, `user_activation_key`, `user_status`, `display_name`) VALUES
-(1, 'admin', '$P$BmCv2eJA4DZAQD1LJK7PUP85I91vm//', 'admin', 'admin@cybunk.com', '', '2010-03-12 08:51:22', '', 0, 'admin'),
-(2, 'ymlh', '$P$BHcdw18xlD8OKqjgdt9QM2JYwcLtEq0', 'ymlh', 'yvesmarielhour@gmail.com', 'http://www.iri.centrepompidou.fr', '2010-03-12 11:30:02', '', 0, 'ymlh');
+(1, 'admin', '$P$BdTh0CkzKLZN4.N4/Ngh54FxZhu/Cs1', 'admin', 'admin@cybunk.com', '', '2010-03-12 08:51:22', '', 0, 'admin');
 
 SET FOREIGN_KEY_CHECKS=1;
 




